)c (GeV/

T,assoc p 1 1.5 2 2.5 3

(rad) φΔσ

0.3

0.4

0.5

0.6

0.7 = 2.76 TeV NNs ALICE, Pb-Pb, 0-10% 50-80%

= 0.2 TeV NNs STAR, Au-Au, 0-12% 40-80% c < 6 GeV/

T,trig p 3 <